So sorry to hear that you are going down with a co...

So sorry to hear that you are going down with a cold. Why don't people stay at home when they are ill rather than spread their germs around.

You wouldn't much like being in England right now as it is STILL raining and bitterly cold and windy. Thank goodness we are not affected here by the dreadful flooding that is affecting much of the country. Many people have seen their homes wrecked. It is just dreadful.

England in summer would suit you.......think about it.